// Real-time monitoring settings have been removed.
export function SettingsMonitoringPanel(_props?: { highlight?: string }) {
  return (
    <div className="flex flex-col items-center justify-center py-16 text-center">
      <p className="text-sm text-muted">实时监控配置已移除</p>
    </div>
  )
}
